58.0

54.0

9:23:50.0

46.0

42.0

30.0

51:00.0

39:50:00.0

49:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 01257556000 / DATE-OBS 2024-10-02T00:52:52.9

UVOT Finding Chart