024681012141618.0

14.0

23:03:10.0

06.0

33:00.0

30.0

32:00.0

31:00.0

35:30:00.0

RA (J2000)

Dec (J2000)

OBSID 01252695000 / DATE-OBS 2024-09-05T18:28:33.3

UVOT Finding Chart