0123456754.0

16:56:50.0

46.0

42.0

30.0

18:20:00.0

19:00.0

18:00.0

17:30.0

RA (J2000)

Dec (J2000)

OBSID 01246989000 / DATE-OBS 2024-08-05T14:34:28.9

UVOT Finding Chart