1500

2000

2500

3000

3500

4000

4500

2:32:30.0

2:31:30.0

30:30.0

14:00.0

12:00.0

10:00.0

08:00.0

06:00.0

04:00.0

02:00.0

59:00:00.0

58:00.0

58:56:00.0

RA (J2000)

Dec (J2000)

OBSID 01245636000 / DATE-OBS 2024-07-30T07:57:31.3

UVOT Finding Chart