20.0

17:36:00.0

40.0

35:20.0

10:00.0

05:00.0

13:00:00.0

12:55:00.0

RA (J2000)

Dec (J2000)

OBSID 00231231000 / DATE-OBS 2006-09-26T16:49:40.0